<!-- 参比荧光选择 -->
<template>
    <StepFormPackage :fieldItemLabel = "fieldItemLabel" ref="stepFormPackageRef" :prefixKey="stepIndex+'_'+'pcrfxyp_cbygxz'" @resetRecord = "resetRecord" :form-config="formConfig" :formData="formData" />
</template>

<script>
import StepFormPackage from '@/components/Template/StepFormPackage.vue';
import stepMixins from '@/components/Template/mixins/stepMixins.js';

export default {
    mixins: [stepMixins],
    components: {
        StepFormPackage
    },
    computed: {
        formConfig() {
            return [{
                config: {
                    text1: {
                        label: "参比荧光预计选择",
                        type: "text",
                    },
                    yj:{
                        fillType: "preFill",
                        type: "select",
                        options:this.getDictOptions('business_step_pcrfxyp'),  
                        otherCode: "yjOther",
                    },
                    text2: {
                        label: "实际选择",
                        type: "text",
                    },
                    sj:{
                        fillType: "actFill",
                        type: "select",
                        options:this.getDictOptions('business_step_pcrfxyp'), 
                        otherCode: "sjOther",
                        compareTo:'yj' 
                    },
                    text3: {
                        label: "。",
                        type: "text",
                    },
                }
            }]
        }
    },
}
</script>

<style lang="scss" scoped></style>