<!-- 轻柔混匀 -->
<template>
    <StepFormPackage :fieldItemLabel = "fieldItemLabel" ref = "stepFormPackageRef" :prefixKey="stepIndex+'_'+'pcr_qrhy'" @resetRecord = "resetRecord" :form-config="formConfig" :formData = "formData" />
</template>

<script>
import StepFormPackage from '@/components/Template/StepFormPackage.vue';
import stepMixins from '@/components/Template/mixins/stepMixins.js';    

    export default {
        mixins: [stepMixins],
        props: {
            sn: {
                type: String,
                default: 'qrhy',
            },
        },
        components: {
            StepFormPackage
        },
        computed: {
            formConfig() {
                return [{
                    config:{
                        text1:{
                            label:this.sn==='qrhy'?"轻柔混匀。":this.sn==='pebwfz'?"1号位放置磁棒套，2号位放置磁珠板，3号位放置样品板，4-7号位分别放置空的深孔板，8号位放置洗脱液":this.sn==='lsbwfz'?"根据软件提示，在相应位置放入需要的试剂和耗材。":"",
                            type:"text",
                        },
                        check:{
                            type:"checkbox",
                            fillType:"actFill",
                        },
                    }
                }]
            }
        },
    }
</script>

<style lang="scss" scoped>

</style>