<!-- 加入溶液 -->
<template>
    <StepFormPackage ref="stepFormPackageRef" :prefixKey="stepIndex+'_'+'b_jrry_b'" @resetRecord = "resetRecord" :form-config="formConfig" :formData="formData" />
</template>

<script>
import StepFormPackage from '@/components/Template/StepFormPackage.vue';
import stepMixins from '@/components/Template/mixins/stepMixins.js';

export default {
    mixins: [stepMixins],
    components: {
        StepFormPackage
    },
    computed: {
        formConfig() {
            return [{
                config: {
                    text1: {
                        label: "使用",
                        type: "text",
                    },
                    ytrq: {
                        fillType: "preFill",
                        type: "input",
                    },
                    yq: {
                        fillType: "actFill",
                        type: "yq",
                    },
                    text2: {
                        label: "仪器，按上表进行加液。",
                        type: "text",
                    },
                    reamrk: {
                        fillType: "actFill",
                        type: "input",
                    },
                }
            }]
        }
    },
}
</script>

<style lang="scss" scoped></style>